amplitude V

-45

-37.5

-30

-22.5

-15

-7.5

Start: 2001-01-26 08:00:00.0

08:00 08:30 09:00 09:30 10:00 10:30 11:00 11:30 UT Interval: 14400.0s

Cluster 1 efw E p1 10Hz any [-50,-3 V] SC Cluster 2 efw E p1 10Hz any [-50,-3 V] SC Cluster 3 efw E p1 10Hz any [-50,-3 V] SC Cluster 4 efw E p1 10Hz any [-50,-3 V] SC

ISDAT igr 3.2 <4-SC-pot.igr> rico@anna 2002-01-30 11:49:52.0 File: 2001-01-26_0800-1400.ps q0 = Cluster 1 efw E p1 10Hz any (2.7.2.2.2) q1 = Cluster 2 efw E p1 10Hz any (2.7.2.2.2) q2 = Cluster 3 efw E p1 10Hz any (2.7.2.2.2) q3 = Cluster 4 efw E p1 10Hz any (2.7.2.2.2)